Targetry R&D

Liquid Metal/Beam Containment Vessel $30,000 $30,000 Instrumentation $80,000 $80,000 Test at AGS $10,000 $10,000 Liquid Metal Jet I Jet prototyping $20,000 $20,000 Instrumentation $50,000 $50,000 Test at FSU $10,000 $10,000 Liquid Metal Jet II Design $20,000 $20,000 Liquid Jet $20,000 $20,000 Containment Vessel $20,000 $20,000 Instrumentation $20,000 $20,000 Test at AGS, I $10,000 $10,000 AGS Extraction Upgrade $100,000 $100,000 Test at AGS, II $10,000 $10,000 Pulsed Solenoid Design $26,649 $27,495 $25,856 $80,000 Coil Purchase/Fabrication $35,000 $465,000 $500,000 Assembly $100,000 $100,000 LN2 Cryostat Design $50,000 $50,000 LN2 Cryostat Fabrication $12,820 $87,180 $100,000 LN2 Handling $20,000 $20,000 Move/Refurbish PS $40,000 $40,000 Move Substation $40,000 $40,000 Substation Attachment $20,000 $20,000 Switching System $30,000 $30,000 Test at AGS $20,000 $20,000 RF Systems

RF Cavity

Design $100,000 $100,000 Purchase/Fabricate $600,000 $600,000 Assembly $20,000 $20,000 Testing I $30,000 $30,000 Refurbish/rebuild $150,000 $150,000 Testing II $30,000 $30,000 Site Preparation

Design $30,000 $30,000 Blockhouse $20,000 $20,000 Shielding $30,000 $30,000 Power Service $20,000 $20,000 Vacuum $50,000 $50,000 DI Water $20,000 $20,000 LBL Transfer

Testing $40,000 $40,000 Packing $5,000 $5,000 Shipping $5,000 $5,000 Low Level RF

Design $10,000 $10,000 Procurement $20,000 $20,000 Testing $10,000 $10,000 Pulsing System

Design $30,000 $30,000 Procurment $247,500 ($217,500) $30,000 Crowbar $247,500 ($217,500) $30,000 Testing $2,180 $17,820 $20,000 RF Solenoid

Coil Design $60,000 $60,000 Coil Fabricate $500,000 $500,000 Iron Design $60,000 $60,000 Iron Fabricate $200,000 $200,000 Support Design $40,000 $40,000 Support Fabricate $50,000 $50,000 Block House $20,000 $20,000 Move/Refurbish PS $30,000 $30,000 Substation Attachment $20,000 $20,000 Assemble/Test $120,000 $120,000 Capture Experiment Bent Solenoid Design $30,000 $30,000 Bent Solenoid Fabrication $500,000 $500,000 Guide Dipole Design $20,000 $20,000 Guide Dipole Fabrication $150,000 $150,000 Transition Magnet Design $20,000 $20,000 Transition Magnet fabrication $100,000 $100,000 Power Suplies $100,000 $100,000 TPC system $240,000 $240,000 TOF System $120,000 $120,000 PWCs and scintillators $150,000 $150,000 Electronics and DAQData acquisition $200,000 $200,000 Counting Trailer $60,000 $60,000 Assemble/Test $60,000 $60,000 Simulation

FY99 $150,000 $150,000 FY00 $150,000 $150,000 FY01 $150,000 $150,000 Total $160,000 $156,649 $187,495 $370,856 $807,820 $249,360 $827,820 $430,000 $590,000 $1,330,000 $680,000 $210,000 $6,000,000

Total

4th Quarter 1st Quarter 2nd Quarter 3rd Quarter 4th Quarter 1st Quarter 2nd Quarter 3rd Quarter 4th Quarter 1st Quarter 2nd Quarter 3rd Quarter