     0

0.0025

 0.005

0.0075

  0.01

0.0125

 0.015

0.0175

  0.02

0.0225

 0.025

       0 1 2 3 4 5

      Sin^22θ_{13}=0.02, Δm_{31}^2=2Ξ10^{-3}eV^2

        P_{dis}
        P_0
        P_{net}
        P_2

              Baseline (km)

Osc. Probability